MODE: APCP_12 at SFC vs APCP_12 at SFC

Forecast Observation Fcst Obs Interest

Model Name: WRF Init Time: Aug 15, 2007 12:00:00 Valid Time: Aug 15, 2007 12:00:00 Lead Time: 00:00:00 Accum Time: 12:00:00 Centroid Distance: 2.00 Boundary Distance: 4.00 Convex Hull Distance: 0.00 Angle Difference: 1.00 Area Ratio: 1.00 Intersection/Area: 2.00 Complexity Ratio: 0.00 Intensity Ratio: 0.00 Total Interest Thresh: 0.70

Forecast Observation Mask Missing: off off Mask Gr/Ply: off/off off/off Raw Thresh: >=0.000 kg/m^2>=0.000 kg/m^2 Conv Radius: 15 gs 15 gs Conv Thresh: >=5.000 kg/m^2>=5.000 kg/m^2 Area Thresh: >=0.000 gs >=0.000 gs Inten Perc: 100 th 100 th Inten Thresh: >=0.000 kg/m^2>=0.000 kg/m^2 Merge Thresh: >=1.250 kg/m^2>=1.250 kg/m^2 Merging: thresh thresh Matching: match/merge Simple(M/U): 0 (0/0) 0 (0/0) Composites: 0 0